NOTA TÉCNICA

Vicugna pacos semen collection methods and review of semen parameters using Triladyl ® diluent

Métodos de recolección del semen de Vicugna pacos y revisión de los parámetros seminales utilizando diluyente Triladyl®

García-Díaz, Juan Ramón; Garzón Jarrín, Rafael Alfonso; Chicaiza Sánchez, Luis Alonso; Villavicencio Villavicencio, Blanca Jeaneth

García-Díaz, Juan Ramón

juanramon@uclv.edu.cu

Marta Abreu” Central University of Las Villas. Faculty of Agricultural Sciences. Department of Veterinary Medicine and Animal Husbandry. Santa Clara, Villa Clara Cuba

Garzón Jarrín, Rafael Alfonso

Technical University of Cotopaxi. Faculty of Agricultural Sciences and Natural Resources. Latacunga Ecuador

Chicaiza Sánchez, Luis Alonso

Technical University of Cotopaxi. Faculty of Agricultural Sciences and Natural Resources. Latacunga Ecuador

Villavicencio Villavicencio, Blanca Jeaneth

Technical University of Ambato. Faculty of Agricultural Sciences. Veterinary Medicine. Cevallos Ecuador

Journal of the Selva Andina Animal Science

Selva Andina Research Society, Bolivia

ISSN: 2311-3766

ISSN-e: 2311-2581

Periodicity: Bianual

vol. 11, no. 2, 2024

editor.animalscience@sars.org.bo

Received: 01 February 2024

Accepted: 01 August 2024

Published: 01 October 2024

URL: https://portal.amelica.org/ameli/journal/198/19850921985092008/

DOI: https://doi.org/10.36610/j.jsaas.2024.110200054x

Selva Andina Research Society

License Creative Commons
This work is licensed under Creative Commons Attribution-NonCommercial 4.0 International.

Non-profit publishing model to preserve the academic and open nature of scientific communication

ePub generated from XML JATS4R

Abstract: To evaluate three methods of collecting Vicugna pacos semen and seminal parameters using Triladyl® extender, this research was carried out from April 25 to July 9, 2023, at the Technical University of Cotopaxi, Ecuador. 9 male alpacas were selected and the effect of semen collection was evaluated using a complete manikin, artificial vagina and urine use (A), rump manikin, artificial vagina and receptive female (B), and penile deviation, artificial vagina and receptive female (C), in libido and copulation. The effect of the Triladyl® extender on the characteristics of fresh and post-thawing semen was studied. Libido and acceptance of the method were compared by multiple comparison of proportions, mounts per hour with the Duncan test, the number of ejaculates with χ² C de Yates and semen characteristics using Student's t-test for paired samples. Libido and method acceptance did not differ between methods. The mounts per hour and the number of ejaculates were higher (P< 0.05) in method C. Concentration and motility in fresh semen were higher (P < 0.05), and mortality and morpho anomalies in post-thawing semen were higher (P < 0.05). It is concluded that method C is the most optimal for semen collection and that the use of Triladyl. diluent in the freezing protocol decreased seminal concentration and motility, while it increased mortality and sperm morpho anomalies after thawing.

Keywords: Ejaculate, volume, concentration, motility, seminal characteristics, cryopreservation.

Resumen: Para evaluar 3 métodos de recolección del semen de Vicugna pacos y los parámetros seminales utilizando diluyente Triladyl®, se desarrolló esta investigación. Del 25 de abril al 9 de julio de 2023, en la Universidad Técnica de Cotopaxi, Ecuador. Se seleccionaron 9 alpacas machos y se evaluó la colección de semen, mediante maniquí completo, vagina artificial y uso de orina (A), maniquí de grupa, vagina artificial y hembra receptiva (B) y desviación de pene, vagina artificial y hembra receptiva (C), en la libido y la cópula. Se estudió el efecto del diluyente Triladyl® en las características del semen fresco y post descongelación. Se compararon la libido y aceptación del método mediante comparación múltiple de proporciones, las montas por hora con la prueba de Duncan, la cantidad de eyaculados con χ² C de Yates y las características seminales mediante t-Student para muestras pareadas. La libido y la aceptación del método no difirieron entre los métodos. Las montas por hora y el número de eyaculados fueron mayores (P< 0.05) en el método C. Fueron superiores (P< 0.05) la concentración, la motilidad en el semen fresco, la mortalidad y las morfo anomalías en el en semen post descongelación. Se concluye que el método C es el más óptimo para la colección del semen y que el empleo del diluyente Triladyl® en el protocolo de congelación disminuyó la concentración y motilidad seminal, mientras que, aumentó la mortalidad y las morfo anomalías espermáticas posterior a la descongelación.

Palabras clave: Eyaculado, volumen, concentración, motilidad, características seminales, criopreservación.

Introduction

To improve the genetics and bio productive and economic performance of the alpaca (Vicugna pacos), reproductive biotechnologies are used, which include, among others, the collection, evaluation, conservation of semen and artificial insemination (AI) 1 .

Semen collection methods should not affect the libido of males, nor trigger inhibitory reflexes that reduce their acceptance, in addition, affect the collection and the quantity of ejaculates per male. They allow obtaining the maximum volume of ejaculate, with absolute purity of the seminal material 2 .

Diluents influence the quality and fertility of alpaca sperm during freezing and post-thawing, because they contribute to maintaining isotonic osmotic pressure, provide nutrients for the life of sperm cells and supply lipoproteins or lecithin’s that protect sperm from cold shock 3 .

In Ecuador, studies on semen collection methods in alpacas are scarce and inconclusive, so research is required to develop a reliable technique for collecting semen that benefits the libido and performance of males during the collection. Furthermore, there is little scientific information available on the diluents and freezing protocols used in the processing and conservation of alpaca semen in Ecuador 4 , so scientific studies are needed on these aspects, which contribute to defining an effective methodology, for the optimization of the semen conservation process in this species and in this way, develop AI and other reproductive techniques.

The objective of this experiment was to evaluate 3 methods of collecting V. pacos semen and semen parameters using Triladyl® diluent.

Materials and methods

This research work was carried out between April 25 and July 9, 2023, in the facilities of the Salache Academic Experimental Center (CEASA) and the Reproduction Biotechnology Laboratory (LBR) of the degree in Veterinary Medicine of the Technical University of Cotopaxi (UTC), located in the Eloy Alfaro parish, 7.7 km from the city of Latacunga, province of Cotopaxi, Ecuador.

The research scenario is geographically located between 16º 31' 28" south latitude (LS) and 68º 20' 39" west longitude (LW), at 3990 m.a.s. with an average temperature of 12° C, average annual rainfall between 500 and 1500 mm and a clay soil 5 .

9 male alpacas (V. pacos) were selected, provided by the UTC and the communities of Macas Chico and Apahua, 3 each, belonging to the province of Cotopaxi. All animals were of the Huacaya breed, aged between 3 and 7 years, weighing 65±3.5 kg, clinically healthy and without reproductive problems or congenital defects.

Their diet was based on natural grasses and water ad libitum. The effect of semen collection methods was evaluated with a complete mannequin, artificial vagina (AV) and urine use (A), rump mannequin, AV and receptive female (B), and penis deviation with AV and receptive female (C) on libido, acceptance of the method, number of mounts and number of ejaculates. The effect of including the Triladyl® extender in the freezing protocol on the characteristics of fresh and post-thawing semen was studied.

The age of the animals was evaluated by inspecting their teeth using the gap technique 6,7 . The reproductive organs (Figure 1) were evaluated by the procedures described by Incahuanaco et al. 7 .

Figure 1
Male reproductive tract evaluation

Raining the male alpaca for riding. Males were selected and kept for 10 days in a pen divided into 2 sections (Figure 2). In one section there were the males and in the other the receptive female, visual contact was facilitated between the animals of both sexes.

The training of the male alpacas for the 3 methods was carried out for 3 weeks at the CEASA facilities, 3 times a week, on alternate days, 2 h in the morning and 2 h in the afternoon.

Mounting procedures. The recognition of the male towards the dummies or the receptive female, the mounting and semen collection were carried out every 48 h, 3 times in a week for each method, the first daily mounting session was carried out between 6:00 and 8:00 in the morning and the second, 12 h after the first.

Figure 2
Separation of male and female alpacas

Before starting method, A (Figure 3A), this body fluid was placed so that the odor (pheromones) was impregnated for 48 h. For method B (Figure 3B), it was required to train the female with the same protocol described for males, so that her handling would be the least stressful. Both methods were executed according to the procedures described by Delgado et al. 8 . For method C (Figure 3C), the female was placed in the sternal position and the male in the copulating position, verifying that the penis was within the AV.

Semen collection. The semen was collected with the AV, according to the methodology described by Sumar 9 . A VA was used that consists of a rubber tube 21 cm long and 4 cm in diameter, to which a latex jacket was internally adapted. Externally, it was covered with an electric blanket to maintain a temperature of 40° C during collection.

The ejaculates were collected in falcon tubes (50 mL), protected by an external cover that maintained a temperature of 37° C, and were transported to the CEASA LBR in less than 1 h from collection. Samples contaminated with urine were not processed.

Figure 3
Methods used for semen collection

A: Complete dummy plus artificial vagina and use of urine. B: Rump dummy, artificial vagina and receptive female. C: Penile detour with artificial vagina and receptive female

Determination of semen parameters. The volume of the ejaculate was determined by direct observation using a graduated cylinder. Semen concentration was determined using the Neubauer chamber and motility using a DM4B microscope (Leica Microsystems AG, USA), at 10X. Both parameters were determined according to the procedures described by Allauca et al. 10 .

Sperm vitality was determined by staining eosin-nigrosin, dead sperm do not They contain dye and appear pink, however, the vivid ones appear translucent 11 .

Sperm morphology was evaluated by observing semen-eosin staining in a scanning electron microscope and the number of morphologically normal and abnormal spermatozoa according to the recommendations of Pérez et al. 12 .

Preparation of the diluent. The diluent was prepared according to the manufacturer's recommendation and kept in a water bath at 37° C. 3 parts of sterile distilled water (60 %), one part of egg yolk in a water bath (20 %) and one part of the Triladyl® commercial concentrate (20 %), then centrifuged at 500 rpm.

Semen dilution. The ejaculate was measured in falcon tubes and kept warm in a water bath at 37º C. The dilution was carried out in a 1:1 ratio of semen and diluent.

Freezing semen with diluent. Once the diluent was mixed and the semen was cooled to 5° C with a cooling rate of 0.4° C/min, and kept at that temperature for 2 h, the sperm were in contact with the glycerol. After this time, the straws were packaged and placed horizontally in a rack at a distance of 4 cm above the surface of the liquid nitrogen, inside a polystyrene box or cooler.

Freezing semen with diluent. Once the diluent was mixed and the semen was cooled to 5° C with a cooling rate of 0.4° C/min, and kept at that temperature for 2 h, the sperm were in contact with the glycerol. After this time, the straws were packaged and placed horizontally in a rack at a distance of 4 cm above the surface of the liquid nitrogen, inside a polystyrene box or cooler.

The straws were placed in liquid nitrogen vapors at -100° C for 20 min, and subsequently deposited directly in liquid nitrogen at -196° C. They were then deposited in the cryogenic tank.

Post-thawing of semen with diluent. Once the sample was frozen, the straw was removed from the cryogenic tank and placed in a water bath at a temperature of 37° C for subsequent use in sperm evaluation.

Statistical processing. Descriptive statistics were obtained for each quantitative variable. Between methods A, B and C, libido and acceptance of the method were compared through a multiple comparison of proportions, the number of matings per hour with the Duncan test 15 and the number of ejaculates with a χ² C Yachts test. The concentration of sperm in the ejaculate, and the motility, mortality and morph anomalies, between fresh semen without diluent and post-thawed semen, with diluent, using the t-Student test for paired samples. The statistical package Statgraphics Centurion Ver. XVII 16 was used in all processing.

Results

Table 1 shows that 22.22 % of the males had high libido when exposed to method A and accepted it, which occurred in 33.33 % of them when exposed to procedures B and C.

Table 1

Aspects evaluated with the three semen collection methods in alpacas

Method | High libido (%) | Method acceptance (%) | Mounts per hour (±DE) | Ejaculates (n)
A | 22.22a | 22.22a | .66±.27b | 0a
B | 33.33a | 33.33a | 1.33±.27b | 0a
C | 33.33a | 33.33a | 3.00±.27a | 3.00 a

Different letters in the same column indicate significant differences p< 0.05.

Multiple comparison of proportions was applied for libido and acceptance of the method.

Duncan 15 to compare the number of mounts per hour and Yates' χ² C to compare the number of ejaculates

With method C, males performed a greater number (P< 0.05) of mounts per hour with procedures A and B (Table 1). With C, 3 ejaculates were obtained, which differed (P< 0.05) with A and B, with which no ejaculates were collected (Table 1). The volume of the ejaculates obtained was 1.30±0.20 mL, with a coefficient of variation of 15.38%.

Table 2

Sperm parameters (x±DE) of fresh and postthawed semen of alpacas

Parameters | Moments
Fresh without diluent | Post thawing, with diluent
Concentration, 10⁶/mL. | 1.80±.10a | 1.30±.10b
Motility, %. | 51.00±2.00a | 13.00±1.00b
Mortality, %. | 17.00±3.00b | 24.33±.57a
Morpho anomalies, %. | 29.00±2.64b | 41.33±1.52a

ab Unequal letters in the same row indicate significant statistical differences at P< 0.01.

(t-Student for paired samples)

Table 3

Morpho anomalies (x±DE) of fresh and postthawed semen of alpacas

Parameters (%) | Moments
Fresh without diluent | Post thawing, with diluent
Curved tails | 9,33±.57a | 8,33±.57a
Double tails | 10.00±4.35a | 13.33±.57a
Free heads | 4.66±1.52a | 2.66±.60a
Double heads | 9.00±3.60a | 13.00±1.00a
Presence of cytoplasmic droplet | 3.66±3.05a | 4.00±1.12a

Concentration and motility decreased (P< 0.05), while mortality and the percentage of sperm with abnormal shapes increased (P< 0.05) after semen thawing (Table 2).

The types of sperm anomalies did not differ statistically between fresh and post-thawing semen, however, numerically, in the latter the percentage of male gametes with curved tails and free heads was reduced, and the percentage of nemasperms with double tails, with double heads and with the presence of cytoplasmic drop (Table 3).

Discussion

The greater acceptance of methods B and C, in which the males had a higher sexual libido, suggests that they are more viable and accepted, which is due to the use of the receptive female, which helped to increase the libido of the males 8 .

Obtaining semen with VA and deviation of the penis has the advantage that the entire ejaculate is collected, without it being contaminated with urine or etiological agents that are in the vagina of the female, without the need for expensive equipment and highly specialized personnel 8 . Its main disadvantage is the need for several days of training for males 6 .

The order of acceptance of the methods in this investigation is similar to that obtained in llamas. However, in this species the acceptance percentages were 80 and 90 % in procedures B and C, respectively 8 . The cause of these differences may be motivated by differences in the temperament and reproductive physiology of each species 7 .

No ejaculates were obtained with methods A and B, with which, the males did not mate correctly and did not adapt to the mannequin, because A has a square shape and its corners hurt the male's abdomen, and in B the rump had a lot of mobility. Furthermore, the alpaca has persistent adhesions of the glans to the foreskin in some animals, which make extrusion of the penis impossible 17 . It also contributed that only 60 % of the males responded well to training with the mannequin, given the nervous nature of the species 18 .

Obtaining ejaculates was associated with the semen collection method used (χ² C Yates = 4.0548, P=.0440).

The greater number of ejaculates with method C was due to the use of the combination of AV with the receptive female. These authors pointed out that the use of AV and a receptive female next to the mannequin increased the copulation time from 15.9 to 16.8 min and the quality of the ejaculate obtained with respect to the use of the mannequin alone.

The volume of the ejaculate in this experiment is lower than that published in alpacas of the Huacaya Breed, 3 to 5 years old, which ranged between 1.48 to 1.91 mL 20 and that, in alpacas of that breed, in which the extraction was performed seminal every 48 h 4 .

The cause of the volume variability in this experiment and the lack of correspondence with published works is due to the fact that this parameter is influenced by race, age, diet, psychosexual separation and collection frequency 21,22 . However, there is consensus that this last factor is the most important cause of variation in ejaculate volume in alpacas 23 .

Furthermore, alpacas have low ejaculate volume24, which presents variability between individuals and between collections in the same male 20 . The evaluation of this parameter is made difficult by the presence of foam that forms during semen collection 21 .

The decrease in the concentration of post-thawed semen is due to the addition of the Triladyl® extender. This and the freezing protocol used could increase the percentage of post-thawing sperm mortality in this experiment and, therefore, do not efficiently fulfill the function of preserving sperm survival after thawing, which is their main evaluation criterion 25 .

The increase in mortality in post-thawing semen may be due to the cellular damage suffered by the spermatozoa, caused by temperature changes during the freezing process, mainly the dehydration of the sperm cells and the formation of intracellular ice crystals during this process 26 .

The decrease in motility after semen thawing corroborates that approximately 50 % of sperm lose their motility during freezing and thawing, which constitutes a challenge in the sperm cryopreservation process 25 .

The percentage of morpho-anomalies in fresh semen is lower than in works published by other authors 23,27 , but those in post-freezing semen are similar to those published by the aforementioned researchers. The abnormal shapes in male gametes prior to dilution could be due to the semen collection method, which causes variation in sperm morphometry 27 .

The increase in abnormal shapes in post-freezing semen compared to fresh semen may be due to the effect of the components of the Triladyl® extender and freezing. Also to the preparation of the sample, fixation method, staining technique, microscopic system and suggestive errors in its determination 28 . These factors can affect the repeatability of the analysis, its reproducibility and the comparison of results between laboratories 29 . However, more precise and conclusive studies are required on the effect of freezing on sperm morpho-anomalies in alpacas.

Sperm concentration, motility and mortality of sperm, and their morpho-anomalies are lower than those obtained in alpacas from Peru 30 . The results of this experiment confirm that the physical and biological characteristics of alpaca semen also vary depending on the collection conditions, including the collection method 31,32 .

It is concluded that the method of penis deviation with AV and receptive female was more accepted, with males, they performed a greater number of mounts per hour and more ejaculates were obtained, making it the most optimal for semen collection. With the use of the Triladyl® diluent in the freezing protocol, semen concentration and motility decreased, while mortality and sperm morpho anomalies increased after thawing.

Cited literature

1. Pérez M, Bustamante C, Coronel I, Carretero MI, Manrique Y, Condori E, et al. Criopreservación de espermatozoides de llama obtenidos del conducto deferente utilizando tres curvas de congelamiento. Rev Investing Vet Perú 2022;33(6):e24099. DOI: http://dx.doi.org/10.15381/rivep.v33i6.24099

2. Singh B, Mal G, Gautam SK, Mukesh M. Reproduction Biotechnology in Camelids. In: Singh B, Mal G, Gautam SK, Mukesh M, editors. Advances in Animal Biotechnology. Switzerland: Springer, Cham; 2019. p. 145-53. DOI: https://doi.org/10.1007/978-3-030-21309-1_13

3. Stuart CC, Vaughan JL, Kershaw CM, de Graaf SP, Bathgate R. Effect of diluent type, cryoprotectant concentration, storage method and freeze/thaw rates on the post-thaw quality and fertility of cryopreserved alpaca spermatozoa. Sci Rep 2019;9(1):12826. DOI: https://doi.org/10.1038/s41598-019-49203-z

4. Garcés Cabrera JE. Evaluación de las características macroscópicas y microscópicas de semen fresco de alpacas en la estación experimental Aña Moyocancha con la aplicación de oligoelementos [tesis licenciatura]. [Riobamba]: Escuela Superior Politécnica de Chimborazo; 2017 [citado 26 de octubre de 2023]. Recuperado a partir de: http://dspace.espoch.edu.ec/handle/123456789/8138

5. Datos meteorológicos de la estación meteorológica de Chalpatán, Carchi [Internet]. Instituto Nacional de Meteorología e Hidrografía. 2024 [citado 19 de enero de 2024]. Recuperado a partir de: https://www.inamhi.gob.ec/

6. García W, Alarcón V, Bravo PW. Inseminación artificial de alpacas con semen refrigerado y con inclusión de dos tipos de yema de huevo. Rev Investig Vet Perú 2017;28(2):337-44. DOI: http://dx.doi.org/10.15381/rivep.v28i2.13080

7. Incahuanaco LM, Ayala RD, Hinojosa RL, Torres EY, Huanca T, Nina A, et al. Eficiencia reproductiva de alpacas machos en relación al tamaño testicular y niveles hormonales durante época reproductiva en puna seca. Rev Agrop Sci & Biotech 2021;1(2):56-62. DOI: https://doi.org/10.25127/riagrop.20212.678

8. Delgado P, Flores F, Fernández R, González V, Maceda E, Copa S, et al. Técnicas de colección de semen en llamas. III Congreso mundial de camélidos. Potosí Bolivia; 2003.

9. Sumar J. Llamas y alpacas. En: Hafez ESE, Hafez B, editores. Reproducción e inseminación artificial en animales. 7ª ed. México: McGraw Hill Interamericana; 2002. p. 224-42.

10. Allauca P, Ugarelli A, Santiani A. Determinación del potencial de membrana mitocondrial mediante citometría de flujo durante el proceso de criopreservación de espermatozoides epididimarios de alpacas. Rev Investig Vet Perú 2019;30(1):288-98. DOI: https://doi.org/10.15381/rivep.v30i1.15677

11. Klimowicz-Bodys MD, Batkowski F, Ochrem AS, Savic MA. Comparison of assessment of pigeon sperm viability by contrast-phase microscope (eosin-nigrosin staining) and flow cytometry (SYBR-14/propidium iodide (PI) staining) [evaluation of pigeon sperm viability]. Theriogenology 2012;77 (3):628-35.DOI: https://doi.org/10.1016/j.theriogenology.2011.09.001

12. Pérez MG, Zevallos J, Perez UH. Recuperación de espermatozoides de alpacas de conducto deferente durante la época reproductiva. Spermova 2014;4 (2):139-44.

13. Galarza Lucero DA. Eficacia de dos diluyentes: tris + lecitina de soya (Andromed(r)) y tris + yema de huevo (Triladyl (r)), en la crioconservación de semen de toro de la raza Jersey en Cuenca-Ecuador [tesis maestría]. [Cuenca]: Universidad de Cuenca; 2013 [citado 26 de octubre de 2023]. Recuperado a partir de: https://dspace.ucuenca.edu.ec/handle/123456789/526

14. Triladyl(r) & Biladyl(r) [Internet]. Minitube. 2018 [citado 23 de noviembre de 2020]. Recuperado a partir de: https://tienda.arbiotech.com.mx/wp-content/uploads/2022/03/13500-xxxx_leaflet-biladyl-triladyl_es_220107.pdf

15. Duncan DB. Multiple range and multiple F tests. Biometrics 1955;11(1):1-42. DOI: https://doi.org/10.2307/3001478

16. Statgraphics Centurion XVIII [Internet]. Statgraphics.Net. 2006 [citado 5 de octubre de 2023]. Recuperado a partir de: https://statgraphics.net/

17. Oscanoa A, Leyva V, García W, Gonzáles De La Cruz R, Alarcón, V. Efecto de la testosterona exógena sobre las adherencias pene-prepuciales y la producción de fibra en Alpacas Huacaya. Rev Investig Vet Perú 2017;28(2):327-36. DOI: http://dx.doi.org/10.15381/rivep.v28i2.13070

18. Alarcón V, García W, Bravo PW. Inseminación artificial de alpacas con semen colectado por aspiración vaginal y vagina artificial. Rev Investig Vet Perú 2012;23(1):58-64. DOI: https://doi.org/10.15381/rivep.v23i1.882

19. Dávalos R, Olazábal J. Evaluación de dos formas de colección de semen en alpacas. Rev Investig Vet Perú 2002;13(2):98-9. DOI: https://doi.org/10.15381/rivep.v13i2.7340

20. Trujillo Bravo J. Estudio histológico del espermatozoide de Alpacas y su correlación con las características microscópicas de calidad seminal en el fundo Ucrucancha - Cerro de Pasco [tesis licenciatura]. [Cerro de Pasco]: Universidad Nacional Daniel Alcides Carrión; 2019. [citado 26 de noviembre de 2023]. Recuperado a partir de: http://repositorio.undac.edu.pe/handle/undac/1490?locale=en

21. Díaz H, Espinoza J, Huanca W, López-Torres B, Rodríguez J. Características bioquímicas del plasma seminal fresco y congelado/descongelado de alpaca (Vicugna pacos). Rev Investig Vet Perú 2015;26(1):43. DOI: https://doi.org/10.15381/rivep.v26i1.10911

22. Juyena NS, Vencato J, Pasini G, Vazzana I, Stelletta C. Alpaca semen quality in relation to different diets. Reprod Fertil Dev 2013;25(4):683-90. DOI: http://doi.org//10.1071/RD12050

23. Tibary A, Vaughan J. Reproductive physiology and infertility in male South American camelids: a review and clinical observations. Small Rumin Res 2006;61(2-3):283-98. DOI: https://doi.org/10.1016/j.smallrumres.2005.07.018

24. Miragaya M, Martínez Sarrasague M, Casaretto M, Rubin de Celis E, Carretero I, Giuliano S. Assessment of apparent viscosity and analysis of rheological profiles in llama ejaculates. En: 16th International Congress on Animal Reproduction (ICAR); 2008; July 13-17; Budapest. Hungry.

25. Bravo W, Alarcón V. Preservación de semen y avances recientes en la inseminación artificial de llamas y alpacas. Spermova 2013;3(2):158-60.

26. Moore AI, Squires EL, Bruemmer JE, Graham JK. Effect of cooling rate and cryoprotectant on the cryosurvival of equine spermatozoa. J Equine Vet Sci 2006;26(5):215-8. DOI: https://doi.org/10.1016/j.jevs.2006.03.003

27. Valle Zapata EM. Evaluación de dos técnicas de colección de semen en llamas (Lama glama) en la Estación Experimental de Choquenaira [tesis licenciatura]. [La Paz]: Universidad Mayor de San Andrés; 2013 [citado 26 de octubre de 2023]. Recuperado a partir de: https://repositorio.umsa.bo/xmlui/handle/123456789/4259

28. Cucho H, López Y, Caldeira C, Valverde A, Ordóñez C, Soler C. Comparison of three different staining methods for the morphometric characterization of Alpaca (Vicugna pacos) sperm, using ISAS(r) CASA-Morph system. Nova Biologica Reperta 2019;6(3):284-91. DOI: https://doi.org/10.29252/nbr.6.3.284

29. Brito LF, Greene LM, Kelleman A, Knobbe M, Turner R. Effect of method and clinician on stal-lion sperm morphology evaluation. Therigenology 2011;76(4):745-50. DOI: https://doi.org/10.1016/j.theriogenology.2011.04.007

30. Flores NH, Cucho H, Carretero MI, Ciprián R, Quispe C, Casa HA, et al. Dimethylformamide cryoprotectant effect on cryopreserved alpaca sperm motility (Vicugna pacos) evaluated by analysis system ISAS(r). Spermova 2015;5(1):47-50. DOI: https://doi.org/10.18548/aspe/0002.10

31. Bravo PW, Skidmore JA, Zhao XX. Reproductive aspects and storage of semen in Camelidae. Anim Reprod Sci 2000;62(1-3):173-93. DOI: https://doi.org/10.1016/s0378-4320(00)00158-5

32. Bravo PW, Alarcon V, Baca L, Cuba Y, Ordoñez C, Salinas J, et al. Semen preservation and artificial insemination in domesticated South American camelids. Anim Reprod Sci 2013;136(3):157-63. DOI: https://doi.org/10.1016/j.anireprosci.2012.10.005

Notes

Source of financing: This research, “Influence of the semen collection method in alpacas (Vicugna pacos) on ejaculation and the Triladyl® extender on semen parameters,” was financed with the researchers' own resources.

_________

Conflicts of interest: The authors declare that they have no potential conflicts of interest with respect to the authorship and/or publication of this article

____________

Acknowledgments: The authors thank the biotechnology laboratory of the Technical University of Cotopaxi, Veterinary Medicine Career, especially the director of the Salache Experimental Center (CEASA) and the staff who work there.

__________

Ethical considerations: The protocols used in the study comply with the European standards indicated at (https://ec.europa.eu/environment/chemicals/lab_animals//legislation_en.htm) for the use of animals in research.

__________

Authors' contribution to the article: Rafael Alfonso Garzón Jarrin, information search, study design, sample taking, writing and drafting of the document. Luis Alonso Chicaiza Sánchez, information search, study design, sample taking, writing and drafting of the document. Blanca Jeaneth Villavicencio Villavicencio, data collection, writing and drafting of the document. Juan Ramón García Díaz, data processing and analysis, editing and revision of the manuscript.

___________

Research limitations: No conclusive results were achieved to establish and validate one of the methods used in this research to obtain semen in alpacas, and a diluent and semen freezing protocol, since the quantities needed for this were not processed.

__________

Article ID: 137/JSAAS/2024.

__________

Editor's Note: Journal of the Selva Andina Animal Science (JSAAS). All statements expressed in this article are solely those of the authors and do not necessarily represent those of their affiliated organizations, or those of the publisher, editors, and reviewers. Any product that may be evaluated in this article, or claim that may be made by its manufacturer, is not guaranteed or endorsed by the publisher.

Author notes

* Contact address: Marta Abreu” Central University of Las Villas. Faculty of Agricultural Sciences. Department of Veterinary Medicine and Animal Husbandry. Road to Camajuaní km. 5 ½. Santa Clara. CP 54830, Santa Clara, Villa Clara, Phone: +53 42281692; +53 428905. Cuba.

Juan Ramón García-Díaz E-mail address: juanramon@uclv.edu.cu

Alternative link

http://www.scielo.org.bo/scielo.php?script=sci_arttext&pid=S2311-25812024000200054&lng=es&nrm=iso&tlng=en (html)